<p>The liver is normal in size and shows uniform parenchymal echogenicity. No focal hepatic mass lesion is seen. The intrahepatic biliary channels and CBD are not dilated. The gallbladder is moderately distended with clear bile and show normal wall thickness. No calculus is seen within it. &nbsp;The spleen, pancreas and para aortic area are within normal limits.</p><p>The kidneys are normal in their position, shape, outline and parenchymal echogenicity. They measure 76mm and 85mm in their bipolar length on the right and left sides respectively. Both show good corticomedullary differentiation and central sinus echo. No definite focal renal mass lesion, calculus or hydronephrosis is seen.&nbsp;</p><p>The demonstrated bowel loops show normal caliber, outline and peristaltic activity. No bowel mass lesion is seen.&nbsp;</p><p>The urinary bladder is moderately distend with urine and shows normal wall thickness. No calculus or echoes is seen.&nbsp;</p>