<p>The uterus is bulky and contains single intact gestational sac with live embryo seen within it. Cardiac activity is present and good.&nbsp;</p><p>CRL= 7.2mm</p><p>GA = 6weeks + 4days</p><p>EDD= 27/05/2022</p><p>The myometrial echoes are normal. Internal os is closed.&nbsp;</p><p>Both adnexa, POD and urinary bladder appear within normal limits.</p><p><strong>Conclusion – Early single viable cyesis at about 7weeks GA</strong></p>